\doxysection{api/index.php File Reference}
\hypertarget{index_8php}{}\label{index_8php}\index{api/index.php@{api/index.php}}


Entrypoint da aplicação.  




\doxysubsection{Detailed Description}
Entrypoint da aplicação. 

Deve ser colocado no diretório api, que é a localização padrão para o Vercel.

PHP version 5.\+3+

\begin{DoxyAuthor}{Author}
Paulo Roma \href{mailto:roma@lcg.ufrj.br}{\texttt{ roma@lcg.\+ufrj.\+br}} 
\end{DoxyAuthor}
\begin{DoxyCopyright}{Copyright}
2019-\/2022 Paulo Roma 
\end{DoxyCopyright}
\begin{DoxyVersion}{Version}
SVN\+: \$\+Id\$ 
\end{DoxyVersion}
\begin{DoxySeeAlso}{See also}
\href{/cwdc/7-mysql/urna-vercel/api/index.php}{\texttt{ link}} 

\href{https://www.php.net/manual/en/mysqli.construct.php}{\texttt{ https\+://www.\+php.\+net/manual/en/mysqli.\+construct.\+php}} 

\href{https://github.com/vercel-community/php}{\texttt{ https\+://github.\+com/vercel-\/community/php}} 
\end{DoxySeeAlso}
\begin{DoxySince}{Since}
16/05/2023 
\end{DoxySince}


Definition in file \mbox{\hyperlink{index_8php_source}{index.\+php}}.

